X-Git-Url: https://git.distorted.org.uk/~mdw/zones/blobdiff_plain/e80b4c2d249c90cd0229917b1627692e28525ee1..dc153eb7e37188b69dc7f8c6b2c93d68d6a6fedd:/distorted.tex

diff --git a/distorted.tex b/distorted.tex
index bec4f22..1ec0db2 100644
--- a/distorted.tex
+++ b/distorted.tex
@@ -340,9 +340,7 @@ externally available: these are shown in table~\ref{tab:services}.
     Ident & TCP 113      & NTP & UDP 123%
       %%\footnote{Only to upstream ISP's time servers.}
                                             & HTTPS & TCP 443    \\
-    TrIPE & UDP 22\,003
-      & \multicolumn{2}{c|}{---}
-      & \multicolumn{2}{c|}{---}                                 \\ \hlx{vh}
+    rsync & TCP 873      & GIT & TCP 9418   & TrIPE & UDP 22\,003 \\ \hlx{vh}
   \end{tabular}
   \end{minipage}
 
