X-Git-Url: https://git.distorted.org.uk/~mdw/zones/blobdiff_plain/35f3af25ce6e19611793b931f4d8d1ba442cfc71..d8ec5b794e3d69968c8332488f4723bdbfe01362:/distorted.tex

diff --git a/distorted.tex b/distorted.tex
index f143903..1ec0db2 100644
--- a/distorted.tex
+++ b/distorted.tex
@@ -1,7 +1,3 @@
-%&distorted
-
-\ifx\dumped\xxundefined
-
 \documentclass[article, a4paper, 10pt, notitlepage, numbering]{strayman}
 \usepackage[palatino, helvetica, maths=cmr]{mdwfonts}
 \usepackage[T1]{fontenc}
@@ -28,8 +24,6 @@
 
 \errorcontextlines=999
 
-\let\dumped\relax\expandafter\dump\fi
-
 \begin{document}
 \title{@l{distorted.org.uk} network design}
 \author{Mark Wooding}
@@ -346,9 +340,7 @@ externally available: these are shown in table~\ref{tab:services}.
     Ident & TCP 113      & NTP & UDP 123%
       %%\footnote{Only to upstream ISP's time servers.}
                                             & HTTPS & TCP 443    \\
-    TrIPE & UDP 22\,003
-      & \multicolumn{2}{c|}{---}
-      & \multicolumn{2}{c|}{---}                                 \\ \hlx{vh}
+    rsync & TCP 873      & GIT & TCP 9418   & TrIPE & UDP 22\,003 \\ \hlx{vh}
   \end{tabular}
   \end{minipage}
 
