X-Git-Url: https://git.distorted.org.uk/~mdw/strayman/blobdiff_plain/90f427ca53a86760818d767c88d5d29ecb48f5c2..2938496043f273a0e0c5c93e3c126df9731288cf:/strayman.ins

diff --git a/strayman.ins b/strayman.ins
index ce67980..1f9b2a2 100644
--- a/strayman.ins
+++ b/strayman.ins
@@ -6,13 +6,6 @@
 % (c) 1996 Mark Wooding
 %
 
-%----- Revision history -----------------------------------------------------
-%
-% $Log: strayman.ins,v $
-% Revision 1.2  2002/02/24 12:46:09  mdw
-% Replace with the good installer from mdwtools.
-%
-
 % --- Licence note ---
 %
 % strayman installer
