X-Git-Url: https://git.distorted.org.uk/~mdw/sod/blobdiff_plain/cac85e0be5833902081c903f75e348b949294fb9..cc0bcf3915ff3ae0aeaf19cae8d8badfa48983d5:/doc/misc.tex?ds=inline

diff --git a/doc/misc.tex b/doc/misc.tex
index 92223d1..e910956 100644
--- a/doc/misc.tex
+++ b/doc/misc.tex
@@ -7,7 +7,7 @@
 
 %%%----- Licensing notice ---------------------------------------------------
 %%%
-%%% This file is part of the Sensble Object Design, an object system for C.
+%%% This file is part of the Sensible Object Design, an object system for C.
 %%%
 %%% SOD is free software; you can redistribute it and/or modify
 %%% it under the terms of the GNU General Public License as published by
