X-Git-Url: https://git.distorted.org.uk/~mdw/sod/blobdiff_plain/c34b237da0bb4bf08a3531a2e11442623df7e9d4..d164793c40f92287fd6a59c120139569a807b130:/doc/misc.tex?ds=inline

diff --git a/doc/misc.tex b/doc/misc.tex
index f6037e1..f43ec98 100644
--- a/doc/misc.tex
+++ b/doc/misc.tex
@@ -150,6 +150,9 @@ These symbols are defined in the @|sod-utilities| package.
      \-\nlret @<value>^*}
 \end{describe}
 
+\begin{describe}{fun}{partial-order-minima @<items> @<order> @> @<list>}
+\end{describe}
+
 \begin{describe}{fun}
     {frob-identifier @<string> \&key :swap-case :swap-hyphen
       @> @<frobbed-string>}
@@ -565,7 +568,7 @@ These symbols are defined in the @!optparse| package.
 \begin{describe}{var}{*debugout-pathname*}
 \end{describe}
 
-\begin{describe}{fun}{test-module @<path> @<reason>}
+\begin{describe}{fun}{test-module @<path> @<reason> @> @<status>}
 \end{describe}
 
 \begin{describe}{fun}
