X-Git-Url: https://git.distorted.org.uk/~mdw/sod/blobdiff_plain/bb80145308ea388d7c6ed5336c061340e78f66e8..92608d0d73de4a3f5924466c7056433dd0c17487:/doc/cutting-room-floor.tex

diff --git a/doc/cutting-room-floor.tex b/doc/cutting-room-floor.tex
index c8f241b..f4b19b3 100644
--- a/doc/cutting-room-floor.tex
+++ b/doc/cutting-room-floor.tex
@@ -7,7 +7,7 @@
 
 %%%----- Licensing notice ---------------------------------------------------
 %%%
-%%% This file is part of the Sensble Object Design, an object system for C.
+%%% This file is part of the Sensible Object Design, an object system for C.
 %%%
 %%% SOD is free software; you can redistribute it and/or modify
 %%% it under the terms of the GNU General Public License as published by
