X-Git-Url: https://git.distorted.org.uk/~mdw/sod/blobdiff_plain/a588c77a273681e3cdc85d15fc44f3ddb7da9224..3ee33e04477ace9d13587f28253fb8c6d1c7ed6c:/doc/cutting-room-floor.tex

diff --git a/doc/cutting-room-floor.tex b/doc/cutting-room-floor.tex
index c8f241b..f4b19b3 100644
--- a/doc/cutting-room-floor.tex
+++ b/doc/cutting-room-floor.tex
@@ -7,7 +7,7 @@
 
 %%%----- Licensing notice ---------------------------------------------------
 %%%
-%%% This file is part of the Sensble Object Design, an object system for C.
+%%% This file is part of the Sensible Object Design, an object system for C.
 %%%
 %%% SOD is free software; you can redistribute it and/or modify
 %%% it under the terms of the GNU General Public License as published by
