X-Git-Url: https://git.distorted.org.uk/~mdw/sod/blobdiff_plain/1f7d590d9c7b87442c8d8b6424ed4f769d377692..5eeb83d2b620e77000ab77269faa974007c9ff28:/doc/cutting-room-floor.tex?ds=inline

diff --git a/doc/cutting-room-floor.tex b/doc/cutting-room-floor.tex
index c8f241b..f4b19b3 100644
--- a/doc/cutting-room-floor.tex
+++ b/doc/cutting-room-floor.tex
@@ -7,7 +7,7 @@
 
 %%%----- Licensing notice ---------------------------------------------------
 %%%
-%%% This file is part of the Sensble Object Design, an object system for C.
+%%% This file is part of the Sensible Object Design, an object system for C.
 %%%
 %%% SOD is free software; you can redistribute it and/or modify
 %%% it under the terms of the GNU General Public License as published by
