X-Git-Url: https://git.distorted.org.uk/~mdw/sod/blobdiff_plain/10e2dd53b7c4a997aa975831e581b1bd68055d89..713c49900fb0b323eb6d1b57e5737f677ffcbb20:/doc/misc.tex

diff --git a/doc/misc.tex b/doc/misc.tex
index 0fe5165..353c948 100644
--- a/doc/misc.tex
+++ b/doc/misc.tex
@@ -84,7 +84,7 @@ of these are standard.
   If a @<value-form> is omitted, then the value of the corresponding @<var>
   is used.  It is conventional usage for a macro to wrap @|once-only| around
   its body so as to convert the arguments which it should evaluate into safe
-  gensyms capturing their runtime values.  (Not that the simple expansion
+  gensyms capturing their runtime values.  (Note that the simple expansion
   given above can't do this correctly.)  A bare symbol may be written in
   place of a singleton list.
 \end{describe}
