X-Git-Url: https://git.distorted.org.uk/~mdw/rocl/blobdiff_plain/1fe3f5d752d020b857c8b8577948a8fb4a514be0..338077d07f2470684827071c1f15bbc1ee782398:/graph.def

diff --git a/graph.def b/graph.def
new file mode 100644
index 0000000..963a520
--- /dev/null
+++ b/graph.def
@@ -0,0 +1,3 @@
+EXPORTS
+    Graph_Init @1
+    Graph_SafeInit @2
