X-Git-Url: https://git.distorted.org.uk/~mdw/mdwtools/blobdiff_plain/f6197ab531ece80f5b582fb30482b91d69aaab48..baa9f3563a25ec9040d59b44a86d62f4d9786258:/at.dtx

diff --git a/at.dtx b/at.dtx
index 753a475..77bc1e6 100644
--- a/at.dtx
+++ b/at.dtx
@@ -6,16 +6,6 @@
 %
 % (c) 1995 Mark Wooding
 %
-%----- Revision history -----------------------------------------------------
-%
-% $Log: at.dtx,v $
-% Revision 1.1  2002/02/03 20:49:02  mdw
-% Checkin for new build system.
-%
-% Revision 1.3  1996/11/19 20:46:55  mdw
-% Entered into RCS
-%
-%
 % \end{meta-comment}
 %
 % \begin{meta-comment} <general public licence>
