X-Git-Url: https://git.distorted.org.uk/~mdw/mdwtools/blobdiff_plain/f3d67f57f2a7beb2a7d28de91a89adbadda78436..d00a940b2f3b6237ca404e8606754c59f212e45e:/slowbox.dtx

diff --git a/slowbox.dtx b/slowbox.dtx
index d42b792..bf031ba 100644
--- a/slowbox.dtx
+++ b/slowbox.dtx
@@ -124,7 +124,8 @@
 %     {\slowboxend{...\finishsplunt...}...}
 %\end{verbatim}
 % That is, \syntax{"\\slowboxbegin{"<tag>"}{"<stuff>"}"} starts a slow box,
-% beginning with \<stuff> if we're in \opt{show} mode.
+% beginning with \<stuff> if we're in \opt{show} mode; and
+% \syntax{"\\slowboxend{"<stuff>"}"} finishes it, ending with \<stuff>.
 %
 % The |\slowboxbegin| command has a |*|-variant, which causes the box to be
 % typeset regardless of the current mode setting.
