X-Git-Url: https://git.distorted.org.uk/~mdw/mdwtools/blobdiff_plain/e95db22ac41db7725bad349c5ecc517ac6ae7983..e8e9e5d812460c19d276d9449a1792e2b384eb20:/sverb.dtx

diff --git a/sverb.dtx b/sverb.dtx
index d46e842..8432a04 100644
--- a/sverb.dtx
+++ b/sverb.dtx
@@ -598,7 +598,7 @@
 %
 %    \begin{macrocode}
 \def\verbinput{\listinghook\@ifstar{\verbinput@\@input}{\verbinput@\input}}
-\def\verbinput@#1#2{%  
+\def\verbinput@#1#2{%
   \sv@startlisting%
   \setbox\z@\hbox\bgroup%
   #1{#2}%
@@ -1476,7 +1476,7 @@
 % whitespace on the line.
 %
 %    \begin{macrocode}
-\dimendef\svsplit@remain=1 
+\dimendef\svsplit@remain=1
 \dimendef\svsplit@indent=2
 %    \end{macrocode}
 %
@@ -1598,7 +1598,7 @@
 %    \end{macrocode}
 %
 % Otherwise it's a normal character.  If there's not enough space then force
-% a break.  
+% a break.
 %
 %    \begin{macrocode}
     \else%
