X-Git-Url: https://git.distorted.org.uk/~mdw/mdwtools/blobdiff_plain/e8e9e5d812460c19d276d9449a1792e2b384eb20..6a1388ae98e3c04d9d0bf4d99249b228a7934bd9:/at.dtx

diff --git a/at.dtx b/at.dtx
index b8a9251..a9b7d00 100644
--- a/at.dtx
+++ b/at.dtx
@@ -58,6 +58,8 @@
 %<*driver>
 \input{mdwtools}
 \describespackage{at}
+\def\atsign{@}
+\def\athyphen{@\mbox{-}}
 \aton
 \atlet p=\package
 \atdef at{\package{at}}
@@ -106,7 +108,7 @@
 % usual scoping rules.  Both of these commands have corresponding
 % environments with the same names (without the leading `|\|', obviously).
 %
-% \subsection{Defining @-commands}
+% \subsection{Defining \athyphen commands}
 %
 % \DescribeMacro{\newatcommand}
 % \DescribeMacro{\renewatcommand}
@@ -147,7 +149,7 @@
 % use fragile commands in their definitions.  Unless you start doing very
 % strange things, @-commands never need |\protect|ing.
 %
-% \subsection{Predefined @-commands}
+% \subsection{Predefined \athyphen commands}
 %
 % A small number of hopefully useful commands are provided by default.
 % These are described in the table below:
@@ -545,7 +547,7 @@
 % \end{macro}
 %
 %
-% \subsection{Robustness of @-commands}
+% \subsection{Robustness of \athyphen commands}
 %
 % We want all @-commands to be robust.  We could leave them all being
 % fragile, although making robust @-commands would then be almost impossible.
@@ -723,7 +725,7 @@
 % \end{macro}
 % \end{macro}
 %
-% \subsection{Default @-commands}
+% \subsection{Default \athyphen commands}
 %
 % We define some trivial examples to get the user going.
 %
