X-Git-Url: https://git.distorted.org.uk/~mdw/mdwtools/blobdiff_plain/e7e1adf57067181800bebfb98e58831578fcd840..d3d35d4b9cd15420d2111264dab1977517b1d02e:/sverb.dtx

diff --git a/sverb.dtx b/sverb.dtx
index d46e842..99b5549 100644
--- a/sverb.dtx
+++ b/sverb.dtx
@@ -598,7 +598,7 @@
 %
 %    \begin{macrocode}
 \def\verbinput{\listinghook\@ifstar{\verbinput@\@input}{\verbinput@\input}}
-\def\verbinput@#1#2{%  
+\def\verbinput@#1#2{%
   \sv@startlisting%
   \setbox\z@\hbox\bgroup%
   #1{#2}%
@@ -900,7 +900,7 @@
 % If you say \syntax{"\\sv@readenv{"<macro-name>"}"}, it will expand do
 % \begin{listinglist} \listingsize \synshorts
 % <macro-name>"{\\"$_{12}$"end{"$_{12}$<current-env-name>"}"$_{12}$"}"^^A
-%		"{\\end{"<current-env-name>"}}"
+%               "{\\end{"<current-env-name>"}}"
 % \end{listinglist}
 % Easy, no?
 %
@@ -1476,7 +1476,7 @@
 % whitespace on the line.
 %
 %    \begin{macrocode}
-\dimendef\svsplit@remain=1 
+\dimendef\svsplit@remain=1
 \dimendef\svsplit@indent=2
 %    \end{macrocode}
 %
@@ -1598,7 +1598,7 @@
 %    \end{macrocode}
 %
 % Otherwise it's a normal character.  If there's not enough space then force
-% a break.  
+% a break.
 %
 %    \begin{macrocode}
     \else%
