X-Git-Url: https://git.distorted.org.uk/~mdw/mdwtools/blobdiff_plain/e1069af1e2771b20455999803846ee852d7e42d6..ad3a3b7df0a46396a26b78ecf034e5c07d8a6b81:/syntax.dtx

diff --git a/syntax.dtx b/syntax.dtx
index 1226067..c6f04db 100644
--- a/syntax.dtx
+++ b/syntax.dtx
@@ -172,7 +172,7 @@
 % \begin{listing}
 %\def\<#1>{\synt{#1}}
 % \end{listing}
-% to allow you to type "\\<"<text>">" as an alternative to 
+% to allow you to type "\\<"<text>">" as an alternative to
 % "\\synt{"<text>"}".
 %
 % \DescribeMacro\lit
@@ -290,7 +290,7 @@
 % \DescribeMacro{\[[}
 % \DescribeMacro{\]]}
 % You can use syntax diagrams (see below) instead of a straight piece of BNF
-% by enclosing it in a |\[[| \dots |\]]| pair.  Note that you can't mix 
+% by enclosing it in a |\[[| \dots |\]]| pair.  Note that you can't mix
 % syntax diagrams and BNF in a production rule, and you will get something
 % which looks very strange if you try.
 %
@@ -445,7 +445,7 @@
 %
 % \DescribeMacro\tok
 % You can also include text using the |\tok| command.  The argument of this
-% command is typeset in \LaTeX's LR~mode and inserted into the diagram. 
+% command is typeset in \LaTeX's LR~mode and inserted into the diagram.
 % Syntax abbreviations are allowed within the argument, so you can, for
 % example, include textual descriptions like
 % \begin{listing}
@@ -473,7 +473,7 @@
 %
 % Note that items on the backwards arrow of a \env{rep} construction should
 % be displayed \emph{backwards}.  You must put the individual items in
-% reverse order when building this part of your diagrams.  \syn\ will 
+% reverse order when building this part of your diagrams.  \syn\ will
 % correctly reverse the arrows on \env{rep} structures, but apart from
 % this, you must cope on your own.  You are recommended to keep these parts
 % of your diagrams as simple as possible to avoid confusing readers.
@@ -604,7 +604,7 @@
 %
 % You can also alter the appearance of \env{stack}s and \env{rep}s by using
 % their optional positioning arguments.  By default, \env{stack}s descend
-% below the main line of the diagram, and \env{rep}s extend above it.  
+% below the main line of the diagram, and \env{rep}s extend above it.
 % Specifying an optional argument of |[b]| for either environment reverses
 % this, putting \env{stack}s above and \env{rep}s below the line.
 %
@@ -1132,7 +1132,7 @@
 % characters through.  By default, we re-enable |\|, and make `\verb*" "'
 % typeset some space glue, rather than a space character.  A macro
 % `\verb*"\ "' is defined to actually print a space character, which yield
-% `\verb*" "' in the `|\tt|' font. 
+% `\verb*" "' in the `|\tt|' font.
 %
 % Finally, it defines a |\ch| command, which, given a single-character
 % control sequence as its argument, typesets the character.  This is useful,
@@ -1298,7 +1298,7 @@
   \addspecial\|%
   \addspecial\"%
   \catcode`\|\active%
-  \catcode`\<\active% 
+  \catcode`\<\active%
   \catcode`\"\active%
   \catcode`\`\active%
 }
