X-Git-Url: https://git.distorted.org.uk/~mdw/mdwtools/blobdiff_plain/e0464890d25b3299ff008d946e49d3fcf657694b..aecccf6c3d3688b8a30953b7fddc6e72d73b9465:/mdwref.dtx

diff --git a/mdwref.dtx b/mdwref.dtx
index 58bec2e..9810148 100644
--- a/mdwref.dtx
+++ b/mdwref.dtx
@@ -1,13 +1,3 @@
-% \begin{meta-comment}
-%
-% $Id: mdwref.dtx,v 1.3 2003/11/10 14:43:48 mdw Exp $
-%
-% Slightly fancy cross-referencing stuff
-%
-% (c) 2007 Mark Wooding
-%
-% \end{meta-comment}
-%
 % \begin{meta-comment} <general public licence>
 %%
 %% mdwref package -- slightly fancy cross-referencing stuff
