X-Git-Url: https://git.distorted.org.uk/~mdw/mdwtools/blobdiff_plain/c8ea265ae80303acb1d20a8473294fc96c28e1ff..6d44932aa5c1786d1feb36ff0cb2b3402177b40d:/mdwthm.dtx

diff --git a/mdwthm.dtx b/mdwthm.dtx
index ea0f112..d3df627 100644
--- a/mdwthm.dtx
+++ b/mdwthm.dtx
@@ -17,12 +17,12 @@
 %% it under the terms of the GNU General Public License as published by
 %% the Free Software Foundation; either version 2 of the License, or
 %% (at your option) any later version.
-%% 
+%%
 %% This program is distributed in the hope that it will be useful,
 %% but WITHOUT ANY WARRANTY; without even the implied warranty of
 %% MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
 %% GNU General Public License for more details.
-%% 
+%%
 %% You should have received a copy of the GNU General Public License
 %% along with this program; if not, write to the Free Software Foundation,
 %% Inc., 59 Temple Place - Suite 330, Boston, MA 02111-1307, USA.
@@ -36,7 +36,7 @@
 %<+thmstyle>             [2001/09/16 1.0 numbers-in-the-margin theorem style]
 % \end{meta-comment}
 %
-% \CheckSum{205}
+% \CheckSum{204}
 %% \CharacterTable
 %%  {Upper-case    \A\B\C\D\E\F\G\H\I\J\K\L\M\N\O\P\Q\R\S\T\U\V\W\X\Y\Z
 %%   Lower-case    \a\b\c\d\e\f\g\h\i\j\k\l\m\n\o\p\q\r\s\t\u\v\w\x\y\z
@@ -344,7 +344,7 @@
 % Ah, but nobody actually does anything with |\after@thm|.  Let's fix that.
 %
 %    \begin{macrocode}
-\AtEndOfPackage{\def\@endtheorem{\after@thm\endtrivlist\@endpefalse}}
+\AtEndOfPackage{\def\@endtheorem{\after@thm\endtrivlist}}
 %    \end{macrocode}
 % \end{macro}
 % \end{macro}
