X-Git-Url: https://git.distorted.org.uk/~mdw/mdwtools/blobdiff_plain/aecccf6c3d3688b8a30953b7fddc6e72d73b9465..8bc5bdd2f1f9636e1d68bde249d07242c6b29732:/mdwlist.dtx?ds=inline

diff --git a/mdwlist.dtx b/mdwlist.dtx
index d2421a0..31afe9d 100644
--- a/mdwlist.dtx
+++ b/mdwlist.dtx
@@ -1,7 +1,7 @@
 % \begin{meta-comment} <general public licence>
 %%
 %% mdwlist package -- various list-related things
-%% Copyright (c) 1996 Mark Wooding
+%% Copyright (c) 1996, 2002, 2003 Mark Wooding
 %%
 %% This program is free software; you can redistribute it and/or modify
 %% it under the terms of the GNU General Public License as published by
