X-Git-Url: https://git.distorted.org.uk/~mdw/mdwtools/blobdiff_plain/93e82ea563c28fc1c4e088ba361e2f1158663042..e95db22ac41db7725bad349c5ecc517ac6ae7983:/mdwlist.dtx

diff --git a/mdwlist.dtx b/mdwlist.dtx
index 9fb252d..390fe13 100644
--- a/mdwlist.dtx
+++ b/mdwlist.dtx
@@ -6,19 +6,6 @@
 %
 % (c) 1996 Mark Wooding
 %
-%----- Revision history -----------------------------------------------------
-%
-% $Log: mdwlist.dtx,v $
-% Revision 1.2  2003/09/05 16:13:44  mdw
-% Define `note' conditionally, to avoid clashes with `mdwthm' among others.
-%
-% Revision 1.1  2002/02/03 20:49:03  mdw
-% Checkin for new build system.
-%
-% Revision 1.1  1996/11/19 20:52:26  mdw
-% Initial revision
-%
-%
 % \end{meta-comment}
 %
 % \begin{meta-comment} <general public licence>
