X-Git-Url: https://git.distorted.org.uk/~mdw/mdwtools/blobdiff_plain/8abfc04b48dcc8fb2bd9c060c8bf98884680799a..aecccf6c3d3688b8a30953b7fddc6e72d73b9465:/mdwthm.dtx

diff --git a/mdwthm.dtx b/mdwthm.dtx
index a63ec9b..57bd2d3 100644
--- a/mdwthm.dtx
+++ b/mdwthm.dtx
@@ -1,13 +1,3 @@
-% \begin{meta-comment}
-%
-% mdwthm.dtx
-%
-% Standard theorem typesetting
-%
-% (c) 2001 Mark Wooding
-%
-% \end{meta-comment}
-%
 % \begin{meta-comment} <general public licence>
 %%
 %% mdwthm package -- standard theorem stuff
