X-Git-Url: https://git.distorted.org.uk/~mdw/mdwtools/blobdiff_plain/86f6a31e4b41acb71ba37f3838a9ce75f7743330..cd62ff5f802dfaabab9cc4922cba13e4112721b6:/doafter.dtx

diff --git a/doafter.dtx b/doafter.dtx
index f1ec3f2..a4bfa15 100644
--- a/doafter.dtx
+++ b/doafter.dtx
@@ -6,16 +6,6 @@
 %
 % (c) 1996 Peter Schmitt and Mark Wooding
 %
-%----- Revision history -----------------------------------------------------
-%
-% $Log: doafter.dtx,v $
-% Revision 1.1  2002/02/03 20:49:03  mdw
-% Checkin for new build system.
-%
-% Revision 1.2  1996/11/19 20:49:08  mdw
-% Entered into RCS
-%
-%
 % \end{meta-comment}
 %
 % \begin{meta-comment} <general public licence>
