X-Git-Url: https://git.distorted.org.uk/~mdw/mdwtools/blobdiff_plain/5e675b93b596a93906c7c3f2fe97f3c1f1d3fd4f..791242dff3ecd0be7dc41551ea3f6032ea9a9328:/mdwthm.dtx

diff --git a/mdwthm.dtx b/mdwthm.dtx
index 63baaea..d3df627 100644
--- a/mdwthm.dtx
+++ b/mdwthm.dtx
@@ -17,12 +17,12 @@
 %% it under the terms of the GNU General Public License as published by
 %% the Free Software Foundation; either version 2 of the License, or
 %% (at your option) any later version.
-%% 
+%%
 %% This program is distributed in the hope that it will be useful,
 %% but WITHOUT ANY WARRANTY; without even the implied warranty of
 %% MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
 %% GNU General Public License for more details.
-%% 
+%%
 %% You should have received a copy of the GNU General Public License
 %% along with this program; if not, write to the Free Software Foundation,
 %% Inc., 59 Temple Place - Suite 330, Boston, MA 02111-1307, USA.
