X-Git-Url: https://git.distorted.org.uk/~mdw/mdwtools/blobdiff_plain/456186fc35e79d0fffb05bb7165ccc7c08dc0d35..f3d67f57f2a7beb2a7d28de91a89adbadda78436:/slowbox.dtx

diff --git a/slowbox.dtx b/slowbox.dtx
index 09202e2..d42b792 100644
--- a/slowbox.dtx
+++ b/slowbox.dtx
@@ -123,7 +123,7 @@
 %     {...\slowboxbegin{#1}{...\startsplunt...}}
 %     {\slowboxend{...\finishsplunt...}...}
 %\end{verbatim}
-% That is, \syntax{"\\slowboxbegin{"<tag>"}{{"<stuff>"}"} starts a slow box,
+% That is, \syntax{"\\slowboxbegin{"<tag>"}{"<stuff>"}"} starts a slow box,
 % beginning with \<stuff> if we're in \opt{show} mode.
 %
 % The |\slowboxbegin| command has a |*|-variant, which causes the box to be
