X-Git-Url: https://git.distorted.org.uk/~mdw/mdwtools/blobdiff_plain/281c40ee1ab217cc905c97390d8a62584965dd28..61253765e3dc55501c2dc97636ab8b97234fb87a:/centre.dtx?ds=sidebyside

diff --git a/centre.dtx b/centre.dtx
index 3424cbf..8c29a3b 100644
--- a/centre.dtx
+++ b/centre.dtx
@@ -6,13 +6,6 @@
 %
 % (c) 2003 Mark Wooding
 %
-%----- Revision history -----------------------------------------------------
-%
-% $Log: centre.dtx,v $
-% Revision 1.1  2003/09/05 16:09:56  mdw
-% New feature\!
-%
-%
 % \end{meta-comment}
 %
 % \begin{meta-comment} <general public licence>
