X-Git-Url: https://git.distorted.org.uk/~mdw/mdwtools/blobdiff_plain/0fb4766da19521ffc4b25ab564ce36e8c8df5f4b..8bc5bdd2f1f9636e1d68bde249d07242c6b29732:/mdwref.dtx?ds=sidebyside

diff --git a/mdwref.dtx b/mdwref.dtx
index ea3f0a3..e6e20c8 100644
--- a/mdwref.dtx
+++ b/mdwref.dtx
@@ -1,17 +1,7 @@
-% \begin{meta-comment}
-%
-% mdwref.dtx
-%
-% Slightly fancy cross-referencing stuff
-%
-% (c) 2007 Mark Wooding
-%
-% \end{meta-comment}
-%
 % \begin{meta-comment} <general public licence>
 %%
 %% mdwref package -- slightly fancy cross-referencing stuff
-%% Copyright (c) 2007 Mark Wooding
+%% Copyright (c) 2007, 2019 Mark Wooding
 %%
 %% This program is free software; you can redistribute it and/or modify
 %% it under the terms of the GNU General Public License as published by
