From 1d75e8d311b26f6ab7c05fa52d89fac3dcbecdc8 Mon Sep 17 00:00:00 2001
From: Mark Wooding <mdw@distorted.org.uk>
Date: Sun, 9 Aug 2020 18:45:18 +0100
Subject: [PATCH] drwho.tex: Don't put spaces around `=' in TeX.

Having tried it, I've decided it doesn't work.
---
 drwho.tex | 12 ++++++------
 1 file changed, 6 insertions(+), 6 deletions(-)

diff --git a/drwho.tex b/drwho.tex
index 6c2624c..593c731 100644
--- a/drwho.tex
+++ b/drwho.tex
@@ -25,11 +25,11 @@
 \usepackage[palatino, helvetica, courier, maths=cmr]{mdwfonts}
 \usepackage[margin=20mm]{geometry}
 
-\newdimen\titlewidth \titlewidth = 70mm
+\newdimen\titlewidth \titlewidth=70mm
 
 \pagestyle{empty}
-\errorcontextlines = 50
-\showboxbreadth = \maxdimen \showboxdepth = \maxdimen
+\errorcontextlines=50
+\showboxbreadth=\maxdimen \showboxdepth=\maxdimen
 
 \newif\iftop \toptrue
 \def\doctor #1{%
@@ -179,9 +179,9 @@
 
 \begin{document}
 
-\topskip = 0pt
-\baselineskip = 0pt
-\lineskip = 0pt
+\topskip=0pt
+\baselineskip=0pt
+\lineskip=0pt
 
 \global\def\\{&&&&&\cr}
 \halign%
-- 
2.11.0

