From 00f0e7bdf138b702a0fd1f20c01005f453f83fe5 Mon Sep 17 00:00:00 2001
From: Mark Wooding <mdw@distorted.org.uk>
Date: Sat, 8 Aug 2020 14:49:37 +0100
Subject: [PATCH] drwho.tex (\trkendmarker): Lower the rule again to really
 remove the gap.

Apparently I wasn't looking closely enough last time, because there was
still a gap.  Also fix `\depart' to match, again.
---
 drwho.tex | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

diff --git a/drwho.tex b/drwho.tex
index cd0603f..2504cad 100644
--- a/drwho.tex
+++ b/drwho.tex
@@ -119,7 +119,7 @@
 
 \def\trkendmarker#1{%
   \hfil
-  \vrule depth -2.8pt
+  \vrule depth -2.7pt
   \kern-\hrwd
   \zwd{#1}%
   \kern\hrwd
@@ -134,7 +134,7 @@
   \enqueue{name}{$+$ #3}%
 }
 \def\depart#1{%
-  \enqueue{#1}{\trkendmarker{\vrule height 3pt depth -2.6pt width 4pt}}%
+  \enqueue{#1}{\trkendmarker{\vrule height 2.9pt depth -2.5pt width 4pt}}%
   \namelet{trk/#1}\emptytrack
 }
 \def\die#1{%
-- 
2.11.0

