X-Git-Url: https://git.distorted.org.uk/~mdw/drwho/blobdiff_plain/637087030d1b660a2f6ba36c811ca254abc5ae99..7bbf5ae5efa7a4750af220b4d315f15a1d686f42:/drwho.tex

diff --git a/drwho.tex b/drwho.tex
index 5074bfa..168b78e 100644
--- a/drwho.tex
+++ b/drwho.tex
@@ -180,7 +180,7 @@
 }
 
 \edef\oldoutput{\the\output}
-%\output={\showbox255 \oldoutput}
+%%\output={\showbox255 \oldoutput}
 
 \begin{document}
 
