X-Git-Url: https://git.distorted.org.uk/~mdw/drwho/blobdiff_plain/38b7a20b4dd994cc797b8da228bacf74da38ae4e..d64198cce493c2c27df375d5debb0f1fa3551222:/drwho.tex?ds=sidebyside

diff --git a/drwho.tex b/drwho.tex
index 3b53aa7..af01a1b 100644
--- a/drwho.tex
+++ b/drwho.tex
@@ -30,7 +30,7 @@
 \voffset=-1in \topmargin=20mm \headheight=0mm \headsep=0mm
 \textheight=\paperheight \advance\textheight by -2\topmargin
 
-\newdimen\titlewidth \titlewidth=70mm
+\newdimen\titlewidth \titlewidth=0.5\textwidth \advance\titlewidth by -40pt
 
 \pagestyle{empty}
 \errorcontextlines=50
