X-Git-Url: https://git.distorted.org.uk/~mdw/cfd/blobdiff_plain/a1af6b508efcf1e6edb07cc4f471710739e9382c..6247b831dd0e3f9200025241ac93c14e5c1b2539:/gpl.tex

diff --git a/gpl.tex b/gpl.tex
index de5bd11..191ced9 100644
--- a/gpl.tex
+++ b/gpl.tex
@@ -1,7 +1,5 @@
 % \iffalse <meta-comment>
 %
-% $Id: gpl.tex,v 1.2 2004/04/08 01:36:24 mdw Exp $
-%
 % The GNU General Public License as a LaTeX section
 %
 % (c) 1989, 1991 Free Software Foundation, Inc.
